<%namespace name="tools" file="tools.tex"/>

The purpose of this test is to check the ability of the model to provide the output in NetCDF format. This test is a copy of the Carrier and Greenspan test presented in this report as well. The output of this test is provided in both the binary and the NetCDF format. The two formats are compared in the graph presented in \autoref{fig:Netcdf_default_fig1}.

${tools.image('Netcdf/default/', 'fig1.eps')}
