<%namespace name="tools" file="tools.tex"/>

The cross-shore profile in this experiment was derived from the reference profile.

\autoref{fig:Deltaflume_M1263_III_Test-5_fig1} shows the profile development in time, simulated compared to measured. \autoref{tab:Deltaflume_M1263_III_Test-5_skills} shows the Brier Skill Scores at the moments in time which are comparable to profile measurements.

${tools.image('Deltaflume_M1263_III/Test-5/', 'fig1.eps')}
${tools.image('Deltaflume_M1263_III/Test-5/', 'fig2.eps')}
${tools.table('Deltaflume_M1263_III/Test-5/', 'skills.tex')}