5.52 5.54 5.56 5.58 5.6 5.62 x 10^4

3.974

3.976

3.978

3.98

3.982

3.984

3.986 x 10^5

xRD (m)

(d) % zand (D_{50} > 0.063 mm) zoals bepaald op 1 april 2009 yRD (m)

85.00

86.67

88.33

90.00

91.67

93.33

95.00

96.67

98.33

100.00