4 4.2 4.4 4.6 4.8 5 5.2 5.4 5.6 5.8 6 streamwise position [m]

-0.02

-0.015

-0.01

-0.005 0 0.005

0.01

0.015

0.02 bed elevation [m]

600 620 640 660 680 700 720 time [s]