0 0.05 0.1 0.15 0.2 k_{wx} [1/m] 0

0.05

0.1

0.15

0.2 k_{wy} [1/m] a growth decay

0 200 400 600 800 1000 l_{wx} [m] 16 18 20 22 24 26 28 30

B [m] b growth

decay

L1-L3 L2 no sec. flow sec. flow